, GeV/c Tp 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

1v

0

2

-3 10× |<0.8 η ALICE Pb-Pb@2.76TeV | 1 odd even v (a) 5-80%

polynomial fits

(GeV/c) Tp 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

1v

0

2

-3 10×

1 ALICE odd v (b) |<1.3 η Au-Au@200GeV | 1 STAR (scaled) odd v

5-40% 40-80%

0.37 5-40% × 0.37 40-80% ×